DROP TABLE IF EXISTS job;
DROP TABLE IF EXISTS tags;
DROP TABLE IF EXISTS jobtag;
DROP TABLE IF EXISTS configuration;
DROP TABLE IF EXISTS user;
DROP TABLE IF EXISTS notifications;
DROP TABLE IF EXISTS influxdb_configurations;
DROP TABLE IF EXISTS realtime_logs;
DROP TABLE IF EXISTS lvm_conf;
DROP TABLE IF EXISTS machines;
DROP TABLE IF EXISTS logical_volumes
DROP TABLE IF EXISTS volume_groups;
DROP TABLE IF EXISTS physical_volumes;
DROP TABLE IF EXISTS lvm_storage_issuer;
DROP TABLE IF EXISTS machine_conf;

